# WET RUNNING SPEED
#     Nothing faster than 10 feet per minute (.37)
#

# '46' is the velocity equivalent of .37
ramp a  5 46  5 46
ramp b  5 46  5 46

# '.37' is as fast as we want to run projector (10 feet per minute)
spd a .37 .37 1 0
spd b .37 .37 1 0

# Redefine 'ycm' to use 'wet' shooting speed
runcmd ycm     run\ycmwet.run    1
